Atmospheric Ozone

"Smog" Ozone

35

30

25

20

15

10

5

0 5 10 15 20 25 Ozone Amount (pressure, milli-Pascals) 30

Stratospheric Ozone (The Ozone Layer)

Tropospheric Ozone