----------------------<   About RESTORE SaveSet  >----------------------------


This function is used to interactively retrieve the saved plot setup settings 
from a SaveSet file.  It is useful when the desired plot format is used in a 
regular basis.  A new interface is brought up when this button is clicked at 
the MAIN interface.  It contains the following options:

   "Path": The full path where the SaveSet file locates.  The default path to 
           start with is the user's login/home directory.  This field is not 
           editable.
   
   "Filter": The character values which match the ones in the desired file name.
   
   "Subdirectories": Listing of the subdirectories.  The file path can be 
                     selected or changed by clicking on any item on this listing
                     (double clicking on PC).  The selected directory will be 
                     highlighted and displayed in "Path".
   
   "Files": Listing of the file names associated with the filter value in the
            specified directory.  When a file is chosen, its name with the full
            path will be displayed in "Selection". 
   
   "Selection":  Completed file specification of the selected file (i.e. file
                 name + full path).  This field is editable.  A file can be 
                 chosen directly by typing its full name in this field. 
                 After a new value is entered, press RETURN or click "OK" to
                 exit and restore the selected file.
   
   "OK":  Restore the SaveSet file and exit.
   
   "Cancel":  Cancel the selections and exit.
   
   "Help":  Display the help information.



To use: 

   Method 1:   "Search and Click"
   ------------------------------

        Click on the "Subdirectories" to select a directory.  Click on "Files"
        to select a file.  Then click "OK" to restore the selected file.

or

   Method 2:    "Direct Typing" 
   ---------------------------- 
   
        Type the full file name including the path in the dialog box of
        "Selection" and then press RETURN or click "OK".  
                       
